INSERT INTO PARAMETROS (PAR_COD,PAR_ORD,PAR_DES,PAR_VAL)
VALUES ('CFD',143,'0',0)
INSERT INTO PARAMETROS (PAR_COD,PAR_ORD,PAR_DES,PAR_VAL)
VALUES ('CFC',144,'0',0)
GO
