ALTER TABLE TMPDEV ADD TMP_COB DECIMAL(14,4) DEFAULT(0),TMP_IOB DECIMAL(16,4) DEFAULT(0)
ALTER TABLE TMPFAC ADD TMP_COB DECIMAL(14,4) DEFAULT(0),TMP_IOB DECIMAL(16,4) DEFAULT(0)
ALTER TABLE TMPENT ADD TMP_COB DECIMAL(14,4) DEFAULT(0),TMP_IOB DECIMAL(16,4) DEFAULT(0)
