ALTER TABLE INFDOC ADD DOC_CVD INT DEFAULT(0)
ALTER TABLE PLATRANS ADD PLA_NVD INT DEFAULT(0)
ALTER TABLE REMESAS ADD REM_NVD INT DEFAULT(0)
GO
