INSERT INTO PARAMETROS (PAR_COD,PAR_ORD,PAR_DES,PAR_VAL)
VALUES ('ARI',145,'AGENTE AUTORRETENEDOR DE ICA',0)
INSERT INTO PARAMETROS (PAR_COD,PAR_ORD,PAR_DES,PAR_VAL)
VALUES ('IDT',146,'CONTABILIZAR LA RETENCION ICA EN DETALLE-TRANSPORTE',0)
INSERT INTO PARAMETROS (PAR_COD,PAR_ORD,PAR_DES,PAR_VAL)
VALUES ('RDT',147,'CONTABILIZAR RETENCION EN LA FUENTE EN DETALLE-TRANSPORTE',0)
GO
